%%
%% This is file `dtk00.clo',
%% generated with the docstrip utility.
%%
%% The original source files were:
%%
%% dtk.dtx  (with options: `2000')
%% 
%% IMPORTANT NOTICE:
%% 
%% For the copyright see the source file.
%% 
%% Any modified versions of this file must be renamed
%% with new filenames distinct from dtk00.clo.
%% 
%% For distribution of the original source see the terms
%% for copying and modification in the file dtk.dtx.
%% 
%% This generated file may be distributed as long as the
%% original source files, as listed above, are part of the
%% same distribution. (The sources need not necessarily be
%% in the same archive or directory.)
%%  Time-stamp: "dtk.dtx        2006-08-11 18:18:53 CET Mittwoch  RN/HjG/hv"
%%
%%^^A%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%^^A $Id: dtk.dtx,v 1.9b 2006/08/11 21:03:42 hv Exp hv $
%%^^A%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%% Purpose:
%%      LaTeX Class and Styles for ``Die TeXnische Komoedie''.
%%
%% Documentation:
%%      The documentation  can be  generated  from  the original file
%%      dtk.dtx with the doc style/package. LaTeX the file dtk.tex to
%%      get the full documentation in DVI format.
%%
%%
%% Author: Gerd Neugebauer
%%         Mainzer Str. 8
%%         56321 Rhens (Germany)
%% Mail:   gene@gerd-neugebauer.de
%%
%% Copyright (C) 1995-1996 Gerd Neugebauer
%% Copyright (C) 1997-2006 DANTE, Deutschsprachige
%%                           Anwendervereinigung TeX e.V.
%%
%%  dtk.dtx is distributed in the hope that it  will  be useful, but
%%  WITHOUT  ANY  WARRANTY.    No   author  or  distributor  accepts
%%  responsibility to anyone for the consequences of using it or for
%%  whether it serves any particular purpose or works at all, unless
%%  he says so in writing.
%%
%%  Everyone is granted permission to  copy, modify and redistribute
%%  dtk.dtx,  provided  this copyright notice is preserved  and  any
%%  modifications are indicated.
%%
%%
%%  This package is still under development and may be replaced with
%%  a new version which provides enhanced functionality.
%%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%  \CharacterTable
%%  {Upper-case    \A\B\C\D\E\F\G\H\I\J\K\L\M\N\O\P\Q\R\S\T\U\V\W\X\Y\Z
%%   Lower-case    \a\b\c\d\e\f\g\h\i\j\k\l\m\n\o\p\q\r\s\t\u\v\w\x\y\z
%%   Digits        \0\1\2\3\4\5\6\7\8\9
%%   Exclamation   \!     Double quote  \"     Hash (number) \#
%%   Dollar        \$     Percent       \%     Ampersand     \&
%%   Acute accent  \'     Left paren    \(     Right paren   \)
%%   Asterisk      \*     Plus          \+     Comma         \,
%%   Minus         \-     Point         \.     Solidus       \/
%%   Colon         \:     Semicolon     \;     Less than     \<
%%   Equals        \=     Greater than  \>     Question mark \?
%%   Commercial at \@     Left bracket  \[     Backslash     \\
%%   Right bracket \]     Circumflex    \^     Underscore    \_
%%   Grave accent  \`     Left brace    \{     Vertical bar  \|
%%   Right brace   \}     Tilde         \~}
%%
%%^^A%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\emergencystretch = 0pt
\endinput
%%
%% End of file `dtk00.clo'.
